ndiff_ann_l THM

⊢ ∀a:N. (0 -- a) = 0 by Analyze 0 THEN Unfold ‘ndiff‘ 0

|
1. a : N
⊢ imax(0-a;0) = 0 by Unfold ‘imax‘ 0 THEN SplitOnConclITE
END